
diff -r 67a91e28b30f -r e42f9fdb281a tex/vym.tex
--- a/tex/vym.tex	Mon Jun 06 20:27:42 2005 +0000
+++ b/tex/vym.tex	Fri Jul 08 07:24:42 2005 +0000
@@ -751,6 +751,9 @@
 \begin{longtable}{|lcp{8cm}l|} \hline
 Version	&	&	Comment								& Date	\\ \hline \hline \endhead
 	\hline \endfoot
+1.6.8	& - &	Dramatic in speedup in some operations 
+				(e.g. move branch up/down) due to extended 
+				undo engine							& 2005-06-07 \\ 
 1.6.7	& - &	Changed default pdf-reader for Mac OSX & 2005-05-27 \\ 
 		& - &	Bugfix: xLinks stopped working in 1.6.6			&\\
 		& - &	Bugfix: drawing error when using modModeCopy    &\\
@@ -805,7 +808,7 @@
       	& -	&	z-plane of floatimages can be set (manually only)& \\
 		& - &	Bugfix: Wrong ordering of branches, if mainbranch is
 				exactly left of center& \\
-1.4.7 	& -	&	New Export to HTML by Thomas Schraitle.	& 2004-09.24 \\
+1.4.7 	& -	&	New Export to XHTML by Thomas Schraitle.	& 2004-09-24 \\
 		& - &	Bugfix: vymLink&	\\
 		& - &	Bugfix: spaces and dots in filenames	& \\
 		& - &	Bugfix: Error message if xsltproc is not installed& \\




